-5 -4 -3 -2 -1 0 1 2 3 4 5

EOF3 NH SLP anomalies (mb) 1948 - March 2010

9.3% of the variance. Plotted as regression coefficients.

0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0

90N 75N 60N 45N 30N 15N EQ. 15S 30S 45S 60S 75S 90S