-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

ERSST SST trend (C/20yrs) 1981-2004

0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0

90N 75N 60N 45N 30N 15N EQ. 15S 30S 45S 60S 75S 90S