-0.5 -0.375 -0.25 -0.125 0.125 0.25 0.375 0.5

Chlorophyll-a annual range (mg m-3)

0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0

90N 75N 60N 45N 30N 15N EQ. 15S 30S 45S 60S 75S 90S