-0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2

Local corr. chlorophyll-tendency & aerosol, 1998-May2005

0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0

90N 75N 60N 45N 30N 15N EQ. 15S 30S 45S 60S 75S 90S