-0.4 -0.3 -0.2 -0.1 0.1 0.2 0.3 0.4

Correlation of precip. and CTI, all months 1900-49

0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0

90N 75N 60N 45N 30N 15N EQ. 15S 30S 45S 60S 75S 90S