40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

Regression of SLP onto normalized eastern equatorial Pacific SST anomalies (mb), 1950-79

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8