-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8

SLP-based Southern Annular Mode (plotted as correlation) NCEP - NCAR reanalysis, 1979-2010

0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0

80 60 40 20 0 -20 -40 -60 -80