20 40 60 80

COADS 1C SST % months with observations in 1850-74

0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0

90N 75N 60N 45N 30N 15N EQ. 15S 30S 45S 60S 75S 90S