50556065707580859095000510 -1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 Global ENSO SST (tropics minus extratropics) (°C) 1950 - February 2011

Mean 20N-20S minus 20-90N, 20-90S. 1950-79 climatology.