1950 55 60 65 70 75 80 85 90 952000 -40 -30 -20 -10 0 10 20 30 40 QBO 30hPa zonal wind (m/s), 1953 - Sep 2001

Canton Island (3S,172W) Jan 1953 - Aug 1967 Gan/Maledives (1S, 73E) Sep 1967 - Dec 1975 Singapore (1N,104E) Jan 1976 - Sep 2001

Freie Universitaet Berlin