40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

January and February aerosol (1998-2001)

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

March and April aerosol (1998-2001)

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

May and June aerosol (1998-2001)

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

July and August aerosol (1998-2001)

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

September and October aerosol (1998-2001)

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E

November and December aerosol (1998-2001)

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E