-4 -3 -2 -1 0 1 2 3 4

2007 total precipitation (m, from CMAP pentad)

0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0

90N 75N 60N 45N 30N 15N EQ. 15S 30S 45S 60S 75S 90S