140E DL 140W 100W 20S 10 EQ 10 20N 1 -25 -27 17 -22 71 7 -31 -36 70 72 7 70 70 72 65 18 21 12 45 34 7 -18 -8 12 6 26 13

Cor. of CDIAC rainfall and CTI, (seasonal) 1950-79