140E DL 140W 100W 20S 10 EQ 10 20N

-26-10 -26-16 69 75 62 68 75 17 13 9 72 73

19 48 -39 40 18 26 -24-35 -10 7 9 24 32 16

Cor. of CRU23 rainfall and CTI, (monthly) 1950-79