-80 -60 -40 -20 0 20 40 60 80

GHCN gridded precipitation % complete records, 1998-2002

0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0

90N 75N 60N 45N 30N 15N EQ. 15S 30S 45S 60S 75S 90S