50 60 70 80 90 00 10 20 30 40 50 60 70 80 90

-1.5 -1 -0.5 0 0.5 1 1.5 Global-mean sfc. air temp. anoms. (C), 1854-1997 (COADS1c)

Anomalies with respect to 1950-79.