1890 1900 10 20 30 40 1950 60 70 80 90 2000 -2

-1

0

1

2 Normalized Gulf of Guinea rainfall, 1899-2000

Monthly anomalies standardized with respect to 1899-1993. Anomalies filtered with successive 9-, 5-month running means.