19451950 55 60 65 70 75 80 85 90 952000 052010 0 2 4 6 8 10 12 14 16 18 0 2 4 6 cm/month

Sahel and Gulf of Guinea annual precipitation, 1948-2010

January through December averages for 20W-10E and 20-10N Sahel and 10-2.5N Gulf of Guinea. NOAA CPC Precipitation Reconstruction (rain gauge) data.