60 ˚N

70 ˚N

80 ˚N

Figure 1. The locations of surface air temperature observations from “North Pole” manned stations (black dots) from1979–1991, fromArgosbuoys (grey dots) from1979– 1997, and from land stations (diamonds) from 1979–1997.

180 ˚ 0 ˚

90 ˚E

90 ˚W

Barrow

Indian Mountain

Rigor, Colony and Martin, Variations in SAT.