90 00 10 20 30 40 50 60 70 80 90 00

Stand. MJJASO-mean Sahel & Gulf of Guinea rainfall, 1898-2000

Ordinate tick interval of 1 standard deviation.

Mean of monthly standardized indices. Annual values standardized with respect to 1950-93.