1900 10 20 30 401950 60 70 80 902000 10 20 -5 -4 -3 -2 -1 0 1 2 3 4 5 cm/month

Sahel precipitation anomalies 1901-2017

June through October averages over 20-10 °N, 20 °W-10 °E. 1900-2017 climatology Deutscher Wetterdienst Global Precipitation Climatology Centre data

University of Washington Joint Institute for the Study of the Atmosphere and Ocean