Ratio of extreme high SNOW in extreme positive/negative CTI days

Red : more events on positive CTI days || Blue : more events on negative CTI days

Only stations whose ratios are statistically significant at 95% level

1:1-1.5:1 ratio

1.5:1-2:1 ratio

2:1-4:1 ratio

>4:1 ratio