MSU climatology is 1979-96

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E 40E

Annual total Legates/MSU rainfall (mm)

0 400 800 1200 1600 2000 2400 2800 3200 3600 4000 4400 4800