MSU climatology is 1979-96

40E 60E 80E 100E 120E 140E 160E 180 160W140W120W100W 80W 60W 40W 20W 0 20E 40E

November Legates/MSU rainfall (mm/mon)

0 30 60 90 120 150 180 210 240 270 300 330 360 390 420 450 480