100W 90W 80W

105W 100W 95W 90W 85W 80W

December 1992 ERS-1 Vector Wind and Reynold’s SST

100W 90W 80W

105W 100W 95W 90W 85W 80W

December 1992 ERS-1 Vector Wind and Reynold’s SST