120W 110W 100W 90W 80W 70W

5 am, 5 pm, 5 pm minus 5 am Convective Cloud Frequency (%)

120W 110W 100W 90W 80W 70W

0 6 12 18 24 30 36 42 48 54 60

120W 110W 100W 90W 80W 70W