1850 60 70 80 901900 10 20 30 401950 60 70 80 902000 -2 -1 0 1 2 a) rainfall index

Year anomalies

90W 80W 70W 60W 50W 40W 30W 20W 10W 0 10E 20E b) rainfall and surface vector wind