0 30 60 90 120 150 180 210 240 270 300 330 0 90S 75S 60S 45S 30S 15S EQ 15N 30N 45N 60N 75N 90N DJF SLP; c=3hPa; ref=1010hPa

Longitude

Latitude

970 1050 90N

60N

30N

EQ

30S

60S

90S Zon. Avg.