0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0 90S 75S 60S 45S 30S 15S EQ 15N 30N 45N 60N 75N 90N JFM Tropopause Pressure

Longitude

Latitude

100 300 90N

60N

30N

EQ

30S

60S

90S Zon. Avg.