0 30E 60E 90E 120E 150E 180 150W 120W 90W 60W 30W 0 90S 75S 60S 45S 30S 15S EQ 15N 30N 45N 60N 75N 90N

Scale: 10 m/s =

FMA 1000mb Wind

Longitude

Latitude

-10 0 10 90N

60N

30N

EQ

30S

60S

90S Zon. Avg. U

-5 0 5

Zon. Avg. V