Tropospheric temperatures from microwave sounding unit 2lt.

180 150W 120W 90W 60W 30W 0 30E 60E 90E 120E 150E 180

Sfc. and tropospheric temp. trends (C/decade) 1979-98

180 150W 120W 90W 60W 30W 0 30E 60E 90E 120E 150E 180

-0.5 -0.35 -0.2 -0.05 0.1 0.25 0.4