Low AO mean field ice motion.

Scale: 2 cm/s = Mean = 2.21 cm/s NP = 2.63 cm/s

High AO mean field of ice motion.

Scale: 2 cm/s = Mean = 1.89 cm/s NP = 2.95 cm/s